Petrolia 2021-12-20 M6.2 157P

166P

327P

P058

P155

P156

P158

P159

P160

P161

P162

P163

P164

P165

P167

P168

P169

P170

P312

P313

P316

P318

P319

P320

P321

P322

P324

P325

P326

P331

P332

P343

P793

TRND

CME1

CME5 CME6

P314

P315

P317

P329

P330

P340

10 mm